Re: Opteron versus Xeon

:lol: One Nanoscope in the making :wink:

Nano Nano Regards,
Robin Williams

I think nanoscope really would make a good generic name for the STM and all of its cousins.

The first microprocessor, the Intel 4004, had a feature size of ten microns, so a sixteen nanometer processor would be getting close to one thousandth the size.
Statistics: Posted by Dirt — Thu Jul 19, 2007 12:43 am