Re: Opteron versus Xeon

The biggest problem with die shrinking is voltage leakage. I think Intel has found a cure for that for the moment and 45nm seems good and maybe the next shrink after that. But voltage leakage might end up making any further die shrinks very difficult and thus another technological solution to the problem is needed.
Statistics: Posted by M ANSARI — Thu Jul 19, 2007 1:36 pm