Re: Opteron versus Xeon

It would not be a nanoprocessor. A 16 nanometer "process"
(not processor) doesn't mean the cpu is 16 nanometers in size.

Think about it; you can easily see the cpu in your computer without
a microscope.
Statistics: Posted by CRoberson — Wed Jul 18, 2007 10:59 pm